				   NOWRAP
 
  The NOWRAP command disables the wrap around option; input characters beyond
  the buffer size of the terminal are not accepted.
 
  The general format of the NOWRAP command is:
  NOWrap          ! Displays at the users terminal all terminals that have the
		    wrap around option disabled.  When prompted for a terminal
		    the user enters <CR> to have all terminals displayed.
  NOSLave TTn     ! Disables wrap around at terminal TTn: .  A non-priviledged
		    user can display all terminals set to NOSLAVE, but only
		    disable it for TI: . A priviliged user can set any terminal
		    to NOWRAP. Note: n refers to a terminal number.
 
  The NOWRAP command performs the same function as SET /NOWRAP.
 
  Note:   NOW        <=>   SET /NOWRAP
	  NOW TT3    <=>   SET /NOWRAP=TT3:
 
  For more information see the MCR Operations Manual.
 
