				  NORPA
 
  The NORPA command disables the read-pass-all option.  The full duplex
  terminal driver does not pass special function input characters (such as
  CTRL/C) from the terminal to the driver input buffer.
 
  The general format of the NORPA command is:
  NORPa           ! Displays at the users terminal all terminals that have the
		    read-pass-all option disabled.  When prompted for a terminal
		    the user enters <CR> to have all terminals displayed.
  NORPa TTn:      ! Disables the read-pass-all option at  terminal TTn: .  A
		    nonprivileged user can display all terminals set to NORPA,
		    but only declare this for TI:. A priviliged user can specify
		    any terminal.  Note: n refers to a terminal number.
 
  The NORPA command performs the same function as SET /NORPA .
 
  Note:   NORP       <=>   SET /NORPA
	  NORP TT3   <=>   SET /NORPA=TT3:
 
  For more information see the MCR Operations Manual.
 
