 
 The general form of the load device-driver command is:
 
	LOAd dd:</PAR=pname></SIZE=psize></HIGH>
 
 where:
 
 dd:    is a two-character ASCII device name followed by a colon.
 
 pname  is the name of the partition into which the driver is to
	be loaded.  It overrides the partition specified at task
	build time.
 
 psize  is the minimum size (octal words) of the partition into
	which the driver is to be loaded.  If the partition is
	system controlled, the created subpartition will be this
	size.  Psize is rounded up to the next largest unit of
	100 (octal) and must be less than 77741.
 
 /HIGH  if specified, the driver is loaded into the highest
	sufficiently large, available area of the partition
	specified for the driver.  If not specified, the driver
	is loaded into the lowest such area.  If the partition
	is not system controlled, this keyword has no effect.
