 
		     ACTIVE TASK LIST
 
 The general form of the Active Task List display is:
 
		      ATL taskname
 
 Taskname can be null or the name of an active task.  If it is null,
 information is displayed for all active tasks in the system.  If it
 is the name of an active task, only information for that task is
 displayed.
 
 
 For information on interpreting ATL type: HELP ATL Status
 
 
2 STATUS
 
    The ATL command displays the following three-character status codes
    to indicate the status of a task:
 
 CODE        MEANING              CODE           MEANING
 ----        -------              ----           -------
  ABO   Task is being aborted.     NRP    Mapped to nonresident partition.
  ACP   Task is an ACP.            NSD    Cannot rcv data (no sends).
  BFX   Being fixed in memory.    -PMD    Suppress PMD on SST abort.
  CAF   Ckpt spc alloc failure.    OUT    Task is out of memory.
  CAL   Ckpt spc in task image.    PRV    Task is privileged.
 -CHK   Not checkpointable.        RDN    Task I/O is being run down.
  CKD   Checkpointing disabled.    REM    Task is to be removed on exit.
  CKP   Task is checkpointed.      ROV    Task has resident overlays.
  CKR   Ckpt request pending.      SLV    Task is slaved.
  DST   Task AST's disabled.       SPN    Task is being suspended.
 -EXE   Task not in execution.     SPNA   Task suspended prior to AST.
  FXD   Task fixed in memory.      STP    Task stopped for terminal input.
  HLT   Task being terminated.     STPA   Task stopped prior to AST.
  MCR   Task activated by MCR.     TIO    Task waiting for terminal input.
  MSG   Aborted, wtng for TKTN     WFR    Task waiting for event flag(s).
	to output a message.       WFRA   Task was in before AST.
 
