	You must also supply the error number, i.e.,
		HELP FCS ERROR 3

3 -1
  #1
3 -2
  #2
3 -3
  #3
3 -4
  #4
3 -5
  #5
3 -6
  #6
3 -7
  #7
3 -8
  #8
3 -9
  #9
3 -10
  #10
3 -11
  #11
3 -12
  #12
3 -13
  #13
3 -14
  #14
3 -15
  #15
3 -16
  #16
3 -17
  #17
3 -18
  #18
3 -19
  #19
3 -20
  #20
3 -21
  #21
3 -22
  #22
3 -23
  #23
3 -24
  #24
3 -25
  #25
3 -26
  #26
3 -27
  #27
3 -28
  #28
3 -29
  #29
3 -30
  #30
3 -31
  #31
3 -32
  #32
3 -33
  #33
3 -34
  #34
3 -35
  #35
3 -36
  #36
3 -37
  #37
3 -38
  #38
3 -39
  #39
3 -40
  #40
3 -41
  #41
3 -42
  #42
3 -43
  #43
3 -44
  #44
3 -45
  #45
3 -46
  #46
3 -47
  #47
3 -48
  #48
3 -49
  #49
3 -50
  #50
3 -51
  #51
3 -52
  #52
3 -53
  #53
3 -54
  #54
3 -55
  #55
3 -56
  #56
3 -57
  #57
3 -58
  #58
3 -59
  #59
3 -60
  #60
3 -61
  #61
3 -62
  #62
3 -63
  #63
3 -64
  #64
3 -65
  #65
3 -66
  #66
3 -67
  #67
3 -68
  #68
3 -69
  #69
3 -70
  #70
3 -71
  #71
3 -72
  #72
3 -73
  #73
3 -74
  #74
3 -75
  #75
3 -76
  #76
3 -77
  #77
3 -78
  #78
3 -79
  #79
3 -80
  #80
3 -81
  #81
3 -82
  #82
3 -83
  #83
3 -84
  #84
3 -85
  #85
3 -86
  #86
3       1
	.BAD    BAD PARAMETERS
3       2
	.IFC    INVALID FUNCTION CODE
3       3
	.DNR    DEVICE NOT READY
3       4
	.VER    PARITY ERROR ON DEVICE
3       5
	.ONP    HARDWARD OPTION NOT PRESENT
3       6
	.SPC    ILLEGAL USER BUFFER
3       7
	.DNA    DEVICE NOT ATTACHED
3       8
	DAA     DEVICE ALREADY ATTACHED
3       9
	.DUN    DEVICE NOT ATTACHABLE
3       10
	.EOF    END OF FILE DETECTED
3       11
	.EOV    END OF VOLUME DETECTED
3       12
	.WLK    WRITE ATTEMPTED TO LOCKED UNIT
3       13
	.DAO    DATA OVERRUN
3       14
	.SRE    SEND/RECEIVE FAILURE
3       15
	.ABO    REQUEST TERMINATED
3       16
	.PRI    PRIVILEGE VIOLATION
3       17
	.RSU    SHAREABLE RESOURCE IN USE
3       18
	.OVR    ILLEGAL OVERLAY REQUEST
3       19
	.BYT    ODD BYTE COUNT(OR VIRTUAL ADDRESS)
3       20
	.BLK    LOGICAL BLOCK NUMBER TOO LARGE
3       21
	.MOD    INVALID UDC MODULE NUMBER
3       22
	.CON    UDC CONNECT ERROR
3       23
	.NOD    CALLER'S NODES EXHAUSTED
3       24
	.DFU    DEVICE FULL
3       25
	.IFU    INDEX FILE FUL
3       26
	.NSF    NO SUCH FILE
3       27
	.LCK    LOCKED FROM READ/WRITE ACCESS
3       28
	.HFU    FILE HEADER FULL
3       29
	.WAC    ACCESSED FOR WRITE
3       30
	.CKS    FILE HEADER CHECKSUM FAILURE
3       31
	.WAT    ATTRIBUTE CONTROL LIST FORMAT ERROR
3       32
	.RER    FILE PROCESSOR DEVICE READ ERROR
3       33
	.WER    FILE PROCESSOR DEVICE WRITE ERROR
3       34
	.ALN    FILE ALREADY ACCESSED ON LUN
3       35
	.SNC    FILE ID, FILE NUMBER CHECK
3       36
	.SQC    FILE ID SEQUENCE NUMBER CHECK
3       37
	.NLN    NO FLE ACCESSED ON LUN
3       38
	.CLO    FILE NOT PROPERLY CLOSED
3       39
	.NBF    NO BUFFER SPACE AVAILABLE FOR FILE
3       40
	.RBG    ILLEGAL RECORD SIZE
3       41
	.NBK    FILE EXCEEDS SPACE ALLOCATED, NO BLOCKS
3       42
	.ILL    ILLEGAL OPERATION ON FILE DESCRIPTOR BLOCK
3       43
	.BTP    BAD RECORD TYPE
3       44
	.RAC    ILLEGAL RECORD ACCESS BITS EET
3       45
	.RAT    ILLEGAL RECORD ATTRIBUTES BITS SET
3       46
	.RCN    ILLEGAL RECORD NUMBER, TOO LARGE
3       47
	.ICE    INTERNAL CONSISTENCY ERROR
3       48
	.2DV    RENAME - TWO DIFFERENT DEVICES
3       49
	.FEX    RENAME - A NEW FILE NAME ALREADY IN USE
3       50
	.BDR    BAD DIRECTORY FILE
3       51
	.RNM    CANNOT RENAME OLD FILE SYSTEM
3       52
	.BDI    BAD DIRECTORY SYNTAX
3       53
	.FOP    FILE ALREADY OPEN
3       54
	.BNM    BAD FILE NAME
3       55
	.BDV    BAD DEVICE NAME
3       56
	.BBE    BAD BLOCK ON DEVICE
3       57
	.DUP    ENTER - DUPLICATE ENTRY IN DIRECTORY
3       58
	.STK    NOT ENOUGH STACK SPACE(FCS OR FCP)
3       59
	.FHE    FATAL HARDWARE ERROR ON DEVICE
3       60
	.NFI    FILE ID WAS NOT SPECIFIED
3       61
	.ISQ    ILLEGAL SEQUENTIAL OPERATION
3       62
	.EOT    END OF TAPE DETECTED
3       63
	.BVR    BAD VERSION NUMBER
3       64
	.BHD    BAD FILE HEADER
3       65
	.OFL    DEVICE OFF LINE
3       66
	.BCC    BLOCK CHECK, CRC, OR FRAMING ERROR
3       67
	.ONL    DEVICE ONLINE
3       68
	.NNN    NO SUCH NODE
3       69
	.NFW    PATH LOST TO PARTNER
3       70
	.BLB    BAD LOGICAL BLOCK
3       71
	.TMM    TOO MANY OUTSTANDING MESSAGES
3       72
	.NDR    NO DYNAMIC SPACE AVAILABLE
3       73
	.CNR    CONNECTION REJECTED
3       74
	.TMO    TIMEOUT ON REQUEST
3       75
	.EXP    FILE EXPIRATION DATE NOT REACHED
3       76
	.BTF    BAD TAPE FORMAT
3       77
	.NNC    NOT ANSI "D" FORMAT BYTE COUNT
3       78
	.NNL    NOT NETWORK LUN
3       79
	.NLK    TASK NOT LINKED TO SPECIFIED ICS/ICR INTERRUPTS
3       80
	.NST    SPECIFIED TASK NOT INSTALLED
3       81
	.FLN    DEVICE OFFLINE WHEN OFFLINE REQUEST ISSUED
3       82
	.IES    INVALID ESCAPE SEQUENCE
3       83
	.PES    PARTIAL ESCAPES SEQUENCW
3       84
	.ALC    ALLOCATION FAILURE
3       85
	.ULK    UNLOCK FAILURE
3       86
	.WCK    WRITE CHECK FAILURE
3       87
	.NTR    TASK NOT TRIGGERED
3       88
	.REJ    TRANSFER REJECTED BY RECEIVING CPU
3       89
	.FLG    Event Flag Already Specified
3       92
	.IDU    Invalid Device or Unit
