 
		DMP  -- FILE DUMP UTILITY
 
     To run DMP if not installed, type

		RUN DK1:$DMP[/INC=N]
 
 DMP will dump recors up to 2048 bytes in length without specifying 
 an increment.  For larger records, increment DMP accordingly.
 
		outfile=infile/switch(s)
 
  where  outfile  can be an RSX11M file specifier, or the user's
  terminal, TI:.  
 
     For HELP with the DMP switches use keyword
 
		SWITCH LIST
2	SWITCH
3	LIST
 
  NONE		Defaults to word mode octal dump.
  /AS		ASCII dump.
  /BA:n:m	Specifies a two word base block address to which
		other block addresses will be added. n is high order
		part.  m  is low order part
  /BL:n:m	Specifies the range of physical blocks to be dumped.
		n is the first block; m is the last block.
  /BY		Data will be dumped in byte octal format.
  /DC		Data will be dumped in decimal word format
  /DENS:n	Specifies density of TU16 mag tape.
  /EBCDIC (*)	Convert input data from EBCDIC and dump as ASCII.
  /HD		Dump the header of a file.
  /HX		Dump in hexadecimal byte format
  /ID		Display DMP's version number
  /LB		Display logical blocks for a file
  /LC	  (*)	Enable output for ASCII or EBCDIC in lower case.
  /LW		Dump data in hexadecimal double word format.
  /MD[:n]	Memory dump.  Allows control of line numbers.
  /R5		Dump data in RAD50 format.
  /RC		Dump a record at a time in format specifed by one of
		the other switches.
  /SI	  (*)	Output data in signed format.
  /SP		Spool the file to the line printer
  /WD		Dump data in hexadecimal word format.

  (*) indicate non-standard switches added by DSA.
