		     CVL - CHANGE VOLUME LABEL
 
 CVL is a mini-utility which will allow an RSX11M user to view disk
 initialization parameters not displayed via the /VI switch of the MOUnt
 command, and to reset certain critical parameters.
 
	The command line is   CVL  DDn:[newname][/switch]
 
    where: newname  is the new name for the volume
	   switch   is any combination of the following
 
    /VI            Display volume information but change nothing.
    /LRU    = NN   Change the LRU for the volume to NN.
    /MAXEXT = NN   Change the MAXEXT for the volume to NN.
    /MXF    = NNN  Increase maximum # of files allowed on the volume to NNN.
    /WINDOW = NN   Change the default window pointers for the volume.
    /FPRO   = [RWED,RWED,RWED,RWED]  where any of RWED used sets READ, WRITE,
				     EXTEND, or DELETE privileges for SYSTEM,
				     OWNER, GROUP and WORLD, respectively.
 
 Note that in all cases, NN (NNN) is a decimal value; and the volume must be
 mounted.  Also as an aid in recordkeeping, date of initialization is displayed.
