 
		Terminal Control Commands
 
	Control characters are special characters produced by
 holding down the control key and striking some
 other keyboard character. These special characters are used to
 control the output to the terminal. If a command requires that
 the control key be held down before typing the letter, its presence
 is signified by a <CNTL> preceeding the letter.
 
	HELP is available on the following qualifiers
		RUBOUT
		CHARACTERSIZE   Changing character size on 4014 terminals
		<CNTL>C
		<CNTL>R         Retype
		<CNTL>Z         Exit
		<CNTL>Q         Restart
		<CNTL>S         Stop
		<CNTL>O         Stop printing
		<CNTL>U         Delete line
 
	Type  HELP $CONTROL qualifier for more information.
 
2       RUBOUT
	EACH TIME THE RUBOUT KEY IS HIT THE PREVIOUS
	CHARACTER IN THE LINE IS DELETED.
 
 
2       <CNTL>U
 <CNTL>U        TYPING  <CNTL>U  DELETES THE ENTIRE LINE
 
 
2       <CNTL>R
 <CNTL>R        TYPING  <CNTL>R  RETYPES THE LINE WITH RUBOUTS REMOVED
 
 
2       <CNTL>O
 <CNTL>O        TYPING  <CNTL>O  STOPS OUTPUT TO A TERMINAL UNTIL  <CNTL>O
	IS TYPED AGAIN.  ALL OUTPUT SENT TO A TERMINAL WHILE OUTPUT IS
	DISABLED IS LOST.
 
 
2       <CNTL>S
 <CNTL>S        TYPING  <CNTL>S  STOPS OUTPUT TO A TERMINAL BUT NO OUTPUT
	IS LOST.
 
 
2       <CNTL>Q
 <CNTL>Q        TYPING  <CNTL>Q  RESTARTS OUTPUT TO A TERMIAL WHICH WAS
	HALTED BY TYPING  <CNTL>S.
 
 
2       CHARACTERSIZE
 ESC ;  TYPING  ESC ; ON A 4014 TERMINAL WITH THE LOCAL/LINE
	SWITCH SET TO LOCAL, CHANGES THE LETER SIZE TO SMALL.
	THE LOCAL/LINE SWITCH MUST BE RETURNED TO LINE TO
	CONTINUE TALKING TO THE COMPUTER.  ESC  IS THE
	ESCAPE OR ALTMODE KEY ON THE TERMINAL.
 
 
 ESC 8  TYPING  ESC 8  ON A 4014 TERMINAL WITH THE LOCAL/LINE SWITCH
	SET TO LOCAL, CHANGES THE LETTER SIZE TO LARGE.  THE
	LOCAL LINE SWITCH MUST BE RETURNED TO LINE TO CONTINUE
	TALKING WITH THE COMPUTER. ESC  IS THE ESCAPE OR ALTMODE
	KEY ON THE TERMINAL.
 
 
2       <CNTL>C
 <CNTL>C        TYPING  <CNTL>C  ACTIVATES THE SYSTEM MONITOR  MCR.
 
2       <CNTL>Z
 <CNTL>Z        <CNTL>Z IS THE EXIT COMMAND FOR EXITING FROM ANY OF THE
	SYSTEM UTILITY PROGRAMS(PIP, TKB, EDI, F4P).
 
 
