

	MVI IS A PRIVILEGED, UNSUPPORTED UTILITY THAT DISPLAYS
  SELECTED ENTRIES FROM THE MOUNTED VOLUME LIST.


	THE FORMAT OF THE COMMAND IS:

		MVI DDNN:
	OR
		MVI DDNN:/KEYWORD
	OR
		MVI /KEYWORD

	
	DDNN:		- DEVICE MNEMONIC AND UNIT NUMBER

    KEYWORDS  -

	/ALL		- SWITCH TO PRINT EVERYTHING ON MOUNT LIST
	/TERM=TTNN:	- TERMINAL NUMBER OF USER TO BE PRINTED
	/USER		- PRINT ALL DEVICES MOUNTED BY USER


 TYPE HELP/UNS MVI KEYWORD FOR INFORMATION ABOUT EACH KEYWORD
2 ALL	
	THE /ALL KEYWORD MUST BE THE ONLY KEYWORD AND WILL PRINT ALL
    MOUNTERS OF ALL DEVICES.
2 TERM
	THE /TERM KEYWORD IS USED TO DISPLAY ONLY THOSE DEVICES 
    MOUNTED BY A GIVEN USER, "/TERM=TT55:".

	SINCE THE FIRST MOUNT OF A PUBLIC DEVICE IS USURPED BY
    THE SYSTEM, "/TERM=SYSTEM" WILL DISPLAY THESE MOUNTS.
2 USER		
	ALL DEVICES MOUNTED BY THE USER AT THIS TERMINAL WILL
    BE PRINTED.
