! VTEDIT.HLP -   created by TECO on  2/15/79   14:41
!                 edited by TECO on  3/ 9/79   11:58
!                 edited by TECO on  4/ 9/79   11:08
!                 edited by TECO on  4/12/79   16:21
!                 edited by TECO on  6/ 6/79   13:37
!                 edited by TECO on  6/ 7/79   11:31
!                 edited by TECO on  7/10/79   21:34
!                 edited by TECO on 10/11/79   23:38
!                 edited by TECO on 11/13/79   19:24
!
VTEDIT is an interactive keypad editor used in conjunction
 with the TECO text editor on VT52 and VT100 terminals.

Formats

 TECO/VT file-spec                    to edit an existing file
 TECO/VT out-file-spec=in-file-spec   to edit from one file to another
 MAKE/VT file-spec                    to create a new file

As these are not built-in DCL commands, you need to enter

          TECO :== $SYS$SYSTEM:TECO TECO
          MAKE :== $SYS$SYSTEM:TECO MAKE

 in your LOGIN.COM file.  Please also read what HELP TECO INI says.

Complete documentation on VTEDIT can be obtained by printing or
 typing SYS$HELP:VTEDIT.DOC
*Initialization of VTEDIT
VTEDIT can be automatically invoked.

If you create a logical name called TEC$INIT, it can indicate to
 TECO that you wish VTEDIT automatically invoked.  TECO provides
 a flag saying whether your terminal is a scope type terminal
 capable of being used by VTEDIT.  By testing this flag, you can
 use VTEDIT whenever you are using a scope terminal.

The TEC$INIT logical's equivalence string should be:
      ET&512"N 1+ ' 0           to invoke VTEDIT in normal mode
      ET&512"N 1+16+ ' 0        to invoke VTEDIT in SEEALL mode
      ET&512"N 1+32+ ' 0        to invoke VTEDIT in hold screen mode
      ET&512"N 1+16+32+ ' 0     to invoke VTEDIT in SEEALL and hold modes

Alternatively, you can define the TECO command as
  TECO :== $SYS$SYSTEM:TECO TECO/VT       for VTEDIT in normal mode
  TECO :== $SYS$SYSTEM:TECO TECO/VT:SE    for VTEDIT in SEEALL mode
  TECO :== $SYS$SYSTEM:TECO TECO/VT:HO    for VTEDIT in hold screen mode
  TECO :== $SYS$SYSTEM:TECO TECO/VT:SE:HO for VTEDIT in SEEALL+hold mode
 in your LOGIN.COM file.  Please also read what HELP TECO INI says;
 the /VT qualifier can be combined with /NOCRE, /NOINI, and/or /NOMEM.
*Location of VTEDIT
The VTEDIT keypad editing macro is normally located as
      SYS$LIBRARY:VTEDIT.TEC

If you have a private version of VTEDIT, you can create the logical
 name TEC$VTEDIT and set its equivalence string to the file-spec
 of your private version.
*Alternates to VTEDIT
If you have an editing macro that you wish to use instead of VTEDIT,
 you can create the logical name TEC$VTEDIT and set its equivalence
 string to the file-spec of your editing macro.  Then, by including
 the /VTEDIT switch in your TECO invocation or by automatically asking
 for VTEDIT with your private initializer, TECO will load your macro
 instead of VTEDIT.
