		THE DATA ACQUISITION SYSTEM
 
STARTING DATA ACQUISITION RUNNING
 
	At the DECWRITER , LOGON using HELLO using the name  TARGET
and the password  SHOT, i.e.
 
		HELLO TARGET
		password>SHOT     (SHOT will not print on the terminal)
 
or type   HELLO TARGET/SHOT.
 
The system will respond by loging on the data acquisition program, and
starting it.  Enter the shot number, and answer the question as to whether
or not to AUTOLOAD WDI(ask J DOWNWARD or answer no if uncertain{but tell
J DOWNWARD--PLEASE}).
 
     As a savety measure data is automatically logged to tape as it is
taken.  To enable tape logging to occur a tape must be physically mounted on
the tape drive, loaded to BOT, and the following MCR commands should 
be given;
             ALL MM0:
             MOU MM0:SHTSAV
 
 
DO NOT LOG OFF UNTIL READY TO STOP DATA ACQUISITION!!
 
STOPING DATA ACQUISITION
 
	Type ABORT SHOT, and hit carriage return.  Then log off by typing BYE.
 
