
	The possible commands are;
		SET /UIC
		SET /BUF
		SET /HOLD
		SET /NOHOLD
 
	Further HELP may be requested using the KEYWORDS
 
		SET UIC, SET BUF, SET HOLD, SET NOHOLD
 
	The CHARCTER SIZE of a TEKTRONIX 4014 terminal may 
	also be set by keyboard commands(not using the SET 
	command).  For HELP changing character size, type  
 
			HELP SET SIZE
 
2	[UIC]
	#UIC
2	UIC
	The terminal's UIC may be set with a command
		SET /UIC =[GGG,MMM]
	where GGG = group number, MMM = Member number
	The terminal's UIC is displayed by
		       SET /UIC
2	4014
	#BUF
2	VT52
	#BUF
2	DECWRITER
	#BUF
2	BUF
	The terminal's buffer size is set by
		SET /BUF = TTx:NNN.
	where "x" is your terminal number, and NNN is its line 
	length.  The decimal point following NNN is required to
	correctly set the line length to the correct decimal value.
	Typical values are
 
		TERMINAL	BUFFERSIZE
 
		  4014		  132.
		  VT52		   80.
		DECWRITER	  132.
 
 
2	SIZE
 
	The character size of a tektronix 4014 terminal may be changed
	using ESCAPE commands with the keyboard set in local mode
	or using the TCF  MCR command.  To set the size from the
	keyboard, place the LOCAL/LINE switch to LOCAL(disconected from
	the computer).  Type
		ESC 8        For largest character size.	(TCF 33,70)
		ESC 9	     For slightly smaller character.	(TCF 33,71)
		ESC :	     For smaller character still.	(TCF 33,72)
		ESC ;        For smallest character size.	(TCF 33,73)
	Finally return the LINE/LOCAL switch to the LINE polition.
2	HOLD
	A terminal may be set to HOLD screen mode by typing
 
			SET /HOLD = TI:
 
2	NOHOLD
	A terminal may be taken out of HOLD SCREEN mode by typing
			SET /NOHOLD = TI:
 
#
	UNKNOWN QUALIFIER
 
	The only allowed keywords(qualifiers) at this time are
	UIC,BUF,HOLD,NOHOLD,SIZE.
