 
	Some tasks are installed as MCR commands(PIP, EDI, F4P etc.).  They
	may be run by typing their three letter task name.  Fortran tasks
	which the user builds or tasks installed with 6 letter task names,
	must be started via the RUN command.  The User simply types
 
			RUN taskname
 
		or
 
			RUN filespecifier
 
	     Nonprivleged users are allowed to run only public tasks and
	those which they own.  Public tasks are owned by [200,200].
 
	     Additional HELP may be obtained using the following keywords;
			IMMEDIATELY, DELTATIME, ABSOLUTETIME, FILENAME
2	IMMEDIATELY
 
	An INSTALLED task may be run immediately
 
		RUN taskname [/RSI=magu] [/UIC=[uic]]
 
	where:	taskname = 1-6 letter installed taskname
		RSI	 = reschedual interval
			   mag = magnitude
			   u   = units  T - tics
					S - seconds
					M - minutes
					H - hours
			  where u>0 and magu<24 hours total.
		UIC      = UIC under which to run the task(PRIVLEGED option).
2	DELTATIME
 
		RUN taskname  dtime [/RSI=magu] [/UIC=[uic]]
 
	where: taskname = 1-6 letter installed taskname
		RSI	= reschedual interval
		UIC	= [uic]
2	ABSOLUTETIME
 
		RUN taskname  atime [/RSI=magu] [/UIC=[uic]]
	where: 	taskname = 1-6 letter installed taskname
		atime    = absolute time of day when this task is to be run;
			   input format is hh:mm:ss
2	FILENAME
 
	RUN [DEV:] [$] filename [/keyword(s)]
 
	where:	keywords are	/CKP=YES, NO
				/INC=size
				/PAR=pname
				/PMD=No, YES
				/PRI=number
				/SLV=YES, NO
				/TASK=installed task name
				/UIC=[UIC]
#
	UNRECOGNIZED KEYWORD/QUALIFIER
 
	Allowed KEYWORDS are,  IMMEDIATELY, DELTATIME, ABSOLUTETIME,
	and FILENAME.
