 
		FLX -- FILE TRANSFER PROGRAM
 
     FLX provides a means of transfering files between various
 PDP-11 operating systems.  The primary media format is DOS.
 
  To run FLX,   RUN DK1:$FLX
 
   The command line is      outfile/switch=infile/switch.
    By default it is assumed that input files are DOS format
 and output files are RSX format. To change the format use a format 
 switch to specify the file type.
	/DO	DOS format
	/RS	RSX format
	/RT	RT11 format
 
     Further HELP keywords are	TRANSFER-MODE
				SWITCHES
 
2	TRANSFER-MODE
 
	FLX can transfer data in Formatted ASCII, Formatted Binary,
 and Image Mode. Playing with these switches can cause many problems.
 Read the manual(page 3-5 of the Utilities manual), or assume that
 the default setings are used.  To use these switches one must know
 how a file from another system was put on by FLX.
	/FA:n	Formatted ASCII.
	/FB:n	Formatted Binary.
	/IM:n	Image mode.
2	SWITCHES
 
 /BL:n		Indicates the number of contiguous blocks to allocate
		on an output file(must be used with the /CO switch).
 /BS:n		Specifies block size on casset tape output.
 /CO		The output file is to be contiguous.
 /DE		Delete files on DOS-11 DECtape or disk.
 /DI		provide a directory listing
 /FC		Set Fortran carriage control conventions.
 /ID		Display's FLX's version number.
 /LI		Same as /DI
 /NU:n		Used with /ZE and /RT switches to specify number of
		directory blocks to allocate on an RT format disk.
 /SP		Spool the output file.
 /UI		The output file is to have the same UIC as the input file.
 /VE		Verify records written to cassets.
 /ZE		Initialize RT, or DOS volumes.
