 
	YOU MUST ALSO SUPPLY THE ERROR NUMBER, IE
		HELP FCS ERROR 3
  
 
3	1
	.BAD	BAD PARAMETERS
3	2
	.IFC	INVALID FUNCTION CODE
3	3
	.DNR	DEVICE NOT READY
3	4
	.VER	PARITY ERROR ON DEVICE
3	5
	.ONP	HARDWARD OPTION NOT PRESENT
3	6
	.SPC	ILLEGAL USER BUFFER
3	7
	.DNA	DEVICE NOT ATTACHED
3	8
	DEVICE ALREADY ATTACHED
3	9
	.DUN	DEVICE NOT ATTACHABLE
3	10
	.EOF	END OF FILE DETECTED
3	11
	.EOV	END OF VOLUME DETECTED
3	12
	.WLK	WRITE ATTEMPTED TO LOCKED UNIT
3	13
	.DAO	DATA OVERRUN
3	14
	.SRE	SEND/RECEIVE FAILURE
3	15
	.ABO	REQUEST TERMINATED
3	16
	.PRI	PRIVLEGE VIOLATION
3	17
	.RSU	SHAREABLE RESOURCE IN USE
3	18
	.OVR	ILLEGAL OVERLAY REQUEST
3	19
	.BYT	ODD BYTE COUNT(OR VIRTUAL ADDRESS)
3	20
	.BLK	LOGICAL BLOCK NUMBER TOO LARGE
3	21
	.MOD	INVALID UDC MODULE NUMBER
3	22
	.CON	UDC CONNECT ERROR
3	23
	.NOD	CALLER'S NODES EXHAUSTED
3	24
	.DFU	DEVICE FULL
3	25
	.IFU	INDEX FILE FUL
3	26
	.NSF	NO SUCH FILE
3	27
	.LCK	LOCKED FROM READ/WRITE ACCESS
3	28
	.HFU	FILE HEADER FULL
3	29
	.WAC	ACCESSED FOR WRITE
3	30
	.CKS	FILE HEADER CHECKSUM FAILURE
3	31
	.WAT	ATTRIBUTE CONTROL LIST FORMAT ERROR
3	32
	.RER	FILE PROCESSOR DEVICE READ ERROR
3	33
	.WER	FILE PROCESSOR DEVICE WRITE ERROR
3	34
	.ALN	FILE ALREADY ACCESSED ON LUN
3	35
	.SNC	FILE ID, FILE NUMBER CHECK
3	36
	.SQC	FILE ID SEQUENCE NUMBER CHECK
3	37
	.NLN	NO FLE ACCESSED ON LUN
3	38
	.CLO	FILE NOT PROPERLY CLOSED
3	39
	.NBF	NO BUFFER SPACE AVAILABLE FOR FILE
3	40
	.RBG	ILLEGAL RECORD SIZE
3	41
	.NBK	FILE EXCEEDS SPACE ALLOCATED, NO BLOCKS
3	42
	.ILL	ILLEGAL OPERATION ON FILE DESCRIPTOR BLOCK
3	43
	.BTP	BAD RECORD TYPE
3	44
	.RAC	ILLEGAL RECORD ACCESS BITS EET
3	45
	.RAT	ILLEGAL RECORD ATTRIBUTES BITS SET
3	46
	.RCN	ILLEGAL RECORD NUMBER, TOO LARGE
3	47
	NOT USED
3	48
	.2DV	RENAME - TWO DIFFERENT DEVICES
3	49
	.FEX	RENAME - A NEW FILE NAME ALREADY IN USE
3	50
	.BDR	BAD DIRECTORY FILE
3	51
	.RNM	CANNOT RENAME OLD FILE SYSTEM
3	52
	.BDI	BAD DIRECTORY SYNTAX
3	53
	.FOP	FILE ALREADY OPEN
3	54
	.BNM	BAD FILE NAME
3	55
	.BDV	BAD DEVICE NAME
3	56
	.BBE	BAD BLOCK ON DEVICE
3	57
	.DUP	ENTER - DUPLICATE ENTRY IN DIRECTORY
3	58
	.STK	NOT ENOUGH STACK SPACE(FCS OR FCP)
3	59
	.FHE	FATAL HARDWARE ERROR ON DEVICE
3	60
	.NFI	FILE ID WAS NOT SPECIFIED
3	61
	.ISQ	ILLEGAL SEQUENTIAL OPERATION
3	62
	.EOT	END OF TAPE DETECTED
3	63
	.BVR	BAD VERSION NUMBER
3	64
	.BHD	BAD FILE HEADER
3	65
	.OFL	DEVICE OFF LINE
3	66
	.BCC	BLOCK CHECK, CRC, OR FRAMING ERROR
3	68
3	67
		(NOT USED)
3	68
	.NNN	NO SUCH NODE
3	69
	.NFW	PATH LOST TO PARTNER
3	70
	.BLB	BAD LOGICAL BLOCK
3	71
	.TMM	TOO MANY OUTSTANDING MESSAGES
3	72
	.NDR	NO DYNAMIC SPACE AVAILABLE
3	73
	.CNR	CONNECTION REJECTED
3	74
	.TMO	TIMEOUT ON REQUEST
3	75
	.EXP	FILE EXPIRATION DATE NOT REACHED
3	76
	.BTF	BAD TAPE FORMAT
3	77
	.NNC	NOT ANSI "D" FORMAT BYTE COUNT
3	78
	.NNL	NOT NETWORK LUN
3	79
	.NLK	TASK NOT LINKED TO SPECIFIED ICS/ICR INTERRUPTS
3	80
	.NST	SPECIFIED TASK NOT INSTALLED
3	81
	.FLN	DEVICE OFFLINE WHEN OFFLINE REQUEST ISSUED
3	82
	.IES	INVALID ESCAPE SEQUENCE
3	83
	.PES	PARTIAL ESCAPES SEQUENCW
3	84
	.ALC	ALLOCATION FAILURE
3	85
	.ULK	UNLOCK FAILURE
3	86
	.WCK	WRITE CHECK FAILURE
 
 
#
 UNKNOWN QUALIFIER
 
	At present FCS HELP is limited to HELP FCS ERROR NN.
